<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\hypertarget{testtool__specreader_8cpp}{}\section{testtool\+\_\+specreader.\+cpp File Reference}
\label{testtool__specreader_8cpp}\index{testtool\+\_\+specreader.\+cpp@{testtool\+\_\+specreader.\+cpp}}


Tests for the spec readerclass.  


{\ttfamily \#include $&lt;$specreader.\+hpp$&gt;$}\newline
{\ttfamily \#include $&lt;$algorithm$&gt;$}\newline
{\ttfamily \#include $&lt;$iostream$&gt;$}\newline
{\ttfamily \#include $&lt;$string$&gt;$}\newline
{\ttfamily \#include $&lt;$unordered\+\_\+map$&gt;$}\newline
{\ttfamily \#include $&lt;$gtest/gtest.\+h$&gt;$}\newline
{\ttfamily \#include $&lt;$kdb.\+hpp$&gt;$}\newline
Include dependency graph for testtool\+\_\+specreader.\+cpp\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{testtool__specreader_8cpp__incl}
\end{center}
\end{figure}


\subsection{Detailed Description}
Tests for the spec readerclass. 

\begin{DoxyCopyright}{Copyright}
B\+SD License (see L\+I\+C\+E\+N\+S\+E.\+md or \href{https://www.libelektra.org}{\tt https\+://www.\+libelektra.\+org}) 
\end{DoxyCopyright}
</pre></body></html>