<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\hypertarget{kdbmodule_8h}{}\doxysection{kdbmodule.\+h File Reference}
\label{kdbmodule_8h}\index{kdbmodule.h@{kdbmodule.h}}
{\ttfamily \#include $&lt;$kdb.\+h$&gt;$}\newline
{\ttfamily \#include $&lt;$kdbplugin.\+h$&gt;$}\newline
Include dependency graph for kdbmodule.\+h\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{kdbmodule_8h__incl}
\end{center}
\end{figure}
This graph shows which files directly or indirectly include this file\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{kdbmodule_8h__dep__incl}
\end{center}
\end{figure}
\doxysubsection*{Functions}
\begin{DoxyCompactItemize}
\item 
int \mbox{\hyperlink{group__modules_gaa40915e67f973ccd5258aa450bd03585}{elektra\+Modules\+Init}} (Key\+Set $\ast$modules, Key $\ast$error)
\begin{DoxyCompactList}\small\item\em Initialises the module loading system. \end{DoxyCompactList}\item 
elektra\+Plugin\+Factory \mbox{\hyperlink{group__modules_ga09300fbf0e0cfc9dc80bb877b00117c0}{elektra\+Modules\+Load}} (Key\+Set $\ast$modules, const char $\ast$name, Key $\ast$error)
\begin{DoxyCompactList}\small\item\em Load a library with the given name. \end{DoxyCompactList}\item 
int \mbox{\hyperlink{group__modules_ga5646d92ffe3e1e04c4586d9c910ba6bd}{elektra\+Modules\+Close}} (Key\+Set $\ast$modules, Key $\ast$error)
\begin{DoxyCompactList}\small\item\em Close all modules. \end{DoxyCompactList}\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
\begin{DoxyCopyright}{Copyright}
BSD License (see LICENSE.\+md or \href{https://www.libelektra.org}{\texttt{ https\+://www.\+libelektra.\+org}}) 
\end{DoxyCopyright}
</pre></body></html>