\hypertarget{classorg_1_1libelektra_1_1exception_1_1KeyBinaryTypeNotSupportedException}{}\doxysection{org.\+libelektra.\+exception.\+Key\+Binary\+Type\+Not\+Supported\+Exception Class Reference}
\label{classorg_1_1libelektra_1_1exception_1_1KeyBinaryTypeNotSupportedException}\index{org.libelektra.exception.KeyBinaryTypeNotSupportedException@{org.libelektra.exception.KeyBinaryTypeNotSupportedException}}


Indicates a \mbox{\hyperlink{classorg_1_1libelektra_1_1Key}{key\textquotesingle{}s}} underlying native key is of type binary~\newline
 ~\newline
 Binary key values are currently not supported by this binding.  




Inheritance diagram for org.\+libelektra.\+exception.\+Key\+Binary\+Type\+Not\+Supported\+Exception\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=283pt]{classorg_1_1libelektra_1_1exception_1_1KeyBinaryTypeNotSupportedException__inherit__graph}
\end{center}
\end{figure}


Collaboration diagram for org.\+libelektra.\+exception.\+Key\+Binary\+Type\+Not\+Supported\+Exception\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=283pt]{classorg_1_1libelektra_1_1exception_1_1KeyBinaryTypeNotSupportedException__coll__graph}
\end{center}
\end{figure}


\doxysubsection{Detailed Description}
Indicates a \mbox{\hyperlink{classorg_1_1libelektra_1_1Key}{key\textquotesingle{}s}} underlying native key is of type binary~\newline
 ~\newline
 Binary key values are currently not supported by this binding. 

The documentation for this class was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
Key\+Binary\+Type\+Not\+Supported\+Exception.\+java\end{DoxyCompactItemize}
